
Call:
lm(formula = y ~ x)

Residuals:
    Min      1Q  Median      3Q     Max 
-1.5900 -0.8153 -0.1531  0.6379  2.8379 

Coefficients:
            Estimate Std. Error t value Pr(>|t|)    
(Intercept)  0.95130    0.09629    9.88   <2e-16 ***
x            1.13879    0.10960   10.39   <2e-16 ***
---
Signif. codes:  0 ‘***’ 0.001 ‘**’ 0.01 ‘*’ 0.05 ‘.’ 0.1 ‘ ’ 1

Residual standard error: 0.9626 on 98 degrees of freedom
Multiple R-squared:  0.5242,	Adjusted R-squared:  0.5193 
F-statistic:   108 on 1 and 98 DF,  p-value: < 2.2e-16

