\documentclass[dvips]{article}
\usepackage{times,boxdims,graphicx}
\usepackage{siunitx}
\usepackage[scanall]{psfrag}
\addtolength{\textwidth}{2cm}
\addtolength{\textheight}{3cm}
\setlength{\oddsidemargin}{0pt}
\setlength{\evensidemargin}{0pt}
\setlength{\hoffset}{-0.5in}
\pagestyle{empty}
\begin{document}
\thispagestyle{empty}
\includegraphics{test.eps}
\end{document}
